depth [m] zonal a:shipboard; b,c:lowered

a

Fall97 0 100 200 300 400

b

0 100 200 300 400

33 35 34 36 37 38 39 40 41 42 43 44 45 46 47 48 49 50 51 52 53 54 55 56 57 58 59 60 61depth [m]

c

Mid Atlantic Ridge

54 56 58 60 62

0 500 1000 1500 2000 2500 3000 3500

54 56 58 60 62 -5 0 5 tide [cm s -1] latitude

-50 -40 -30 -20 -10 0 10 20 30 40 50 cm s -1

35.33°W, 52.53°N to 24.96°W, 63.07°N: 1997/10/20 to 1997/10/24